2.5 2.4 2.3 2.2 2.1 2.0 1.9 1.8 1.7 1.6 1.5 1.4 1.3

1H ppm

30.8

30.6

30.4

30.2

30.0

29.8

29.6

29.4

29.2

29.0

28.8

28.6

28.4

28.2

28.0

27.8

27.6

27.4

27.2

27.0

26.8

26.6

1 3 C p p m